<template>
  <CRow>
    <CCol :xs="12">
      <CCard class="mb-4">
        <CCardHeader> <strong>Vue Range</strong> <small></small> </CCardHeader>
        <CCardBody>
          <p class="text-body-secondary small">
            Create custom
            <code>&lt;input type=&#34;range&#34;&gt;</code> controls with
            <code>&lt;CFormRange&gt;</code>.
          </p>
          <DocsExample href="forms/range.html">
            <CFormLabel for="customRange1">Example range</CFormLabel>
            <CFormRange id="customRange1" />
          </DocsExample>
        </CCardBody>
      </CCard>
    </CCol>
    <CCol :xs="12">
      <CCard class="mb-4">
        <CCardHeader>
          <strong>Vue Range</strong> <small>Disabled</small>
        </CCardHeader>
        <CCardBody>
          <p class="text-body-secondary small">
            Add the <code>disabled</code> boolean attribute on an input to give
            it a grayed out appearance and remove pointer events.
          </p>
          <DocsExample href="forms/range.html#disabled">
            <CFormLabel for="disabledRange">Disabled range</CFormLabel>
            <CFormRange id="disabledRange" disabled />
          </DocsExample>
        </CCardBody>
      </CCard>
    </CCol>
    <CCol :xs="12">
      <CCard class="mb-4">
        <CCardHeader>
          <strong>Vue Range</strong> <small>Min and max</small>
        </CCardHeader>
        <CCardBody>
          <p class="text-body-secondary small">
            Range inputs have implicit values for <code>min</code> and
            <code>max</code>— <code>0</code> and <code>100</code>, respectively.
            You may specify new values for those using the <code>min</code> and
            <code>max</code> attributes.
          </p>
          <DocsExample href="forms/range.html#min-and-max">
            <CFormLabel for="customRange2">Example range</CFormLabel>
            <CFormRange id="customRange2" :min="0" :max="5" value="3" />
          </DocsExample>
        </CCardBody>
      </CCard>
    </CCol>
    <CCol :xs="12">
      <CCard class="mb-4">
        <CCardHeader>
          <strong>Vue Range</strong> <small>Steps</small>
        </CCardHeader>
        <CCardBody>
          <p class="text-body-secondary small">
            By default, range inputs &#34;snap&#34; to integer values. To change
            this, you can specify a <code>step</code> value. In the example
            below, we double the number of steps by using
            <code>step=&#34;0.5&#34;</code>.
          </p>
          <DocsExample href="forms/range.html#steps">
            <CFormLabel for="customRange3">Example range</CFormLabel>
            <CFormRange
              id="customRange3"
              :min="0"
              :max="5"
              :step="0.5"
              value="3"
            />
          </DocsExample>
        </CCardBody>
      </CCard>
    </CCol>
  </CRow>
</template>

<script>
export default {
  name: 'Range',
}
</script>
